-- 修改表: sys_group
ALTER TABLE `sys_group` ADD COLUMN `max_client_count` int(11) DEFAULT -1 COMMENT '最大客户端数，-1表示不限制' AFTER `max_user_count`;
ALTER TABLE `sys_group` ADD COLUMN `auth_enabled` tinyint(4) DEFAULT 0 COMMENT '授权开关：1-已授权，0-未授权' AFTER `max_client_count`;
ALTER TABLE `sys_group` ADD COLUMN `expire_time` datetime DEFAULT NULL COMMENT '授权到期时间，空表示不过期' AFTER `auth_enabled`;

-- 修改表: sandbox_config
ALTER TABLE `sandbox_config` ADD COLUMN `group_id` bigint(20) DEFAULT NULL COMMENT '用户组/单位ID' AFTER `user_id`;
ALTER TABLE `sandbox_config` ADD KEY `idx_group_id` (`group_id`);
